WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Rotter, Ludwig; Rotter, Louis; Rotter, Luis
identifier: 135098157
birth: 1810-09-06, Wien
death: 1895-04-05, Wien
sex: m
occupation: Organist
occupation: Komponist
occupation: Chordirektor
occupation: Kapellmeister
residence: Wien