WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Schubert, Johann Friedrich
identifier: 11710891X
identifier: BachDigitalPerson_agent_00004658
birth: 1770-12-17, Rudolstadt
death: 1811-10-13, Mülheim bei Köln
sex: m
occupation: Komponist
occupation: Violinist
occupation: Musikdirektor
residence: Sondershausen
residence: Berlin
residence: Stettin
residence: Glogau