WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Belloc-Giorgi, Maria Teresa; Trombetta, Maria Teresa Ottavia Faustina
birth: 1784-07-02, San Benigno Canavese
death: 1855-05-13, San Giorgio Canavese
sex: m
occupation: Sängerin (Mezzo)
residence: Italien
residence: London