WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Roth, Julie Henriette; Rothe, Julie Henriette; Ludwig, Julie Henriette
birth: 1780-01-01/1781-12-31
death: 1849-07-29
sex: f
residence: Dresden
verheiratet mit Johann Traugott Roth(e)