WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Franz Joseph I., Kaiser von Österreich
identifier: 118535013
birth: 1830-08-18, Schönbrunn
death: 1916-11-21, Wien
sex: m
occupation: Kaiser
residence: Wien