WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Attwood, Thomas
identifier: 118650890
birth: 1765-11-23, London
death: 1838-03-28, London
sex: m
occupation: Komponist
occupation: Organist
residence: London