WeGA, Rezeptionsdokumente, Digitale Edition
author: Anonymus
source date: 25. April 1826
language: en
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Covent Garden Theatre.

Oberon was attended by a crowded house last evening. – Before the piece began there was not standing room in the pit. A new and beautifull garden-scene, by Grieve, has been introduced.