WeGA, Rezeptionsdokumente, Digitale Edition
author: Anonymus
source date: 17. April 1826
language: en
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Covent Garden Theatre.

Oberon was performed on Saturday evening to a full pit; the dress, and first circle of boxes was also full, and at half-price every part of the house was crowded. The music and scenery were highly applauded. Madame Vestris was encored in one of her songs. –