WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Sechter, Simon
identifier: 118612514
birth: 1788-10-11, Friedberg (Böhmen)
death: 1867-09-10, Wien
sex: m
occupation: Organist
occupation: Musiktheoretiker
occupation: Komponist
residence: Wien