WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Krebs, Johann Ludwig
identifier: 123281954
identifier: BachDigitalPerson_agent_00003241
birth: 1713-10-10, 1713-10-12, Buttelstedt
death: 1780-01-01, Altenburg
sex: m
occupation: Organist
occupation: Komponist
residence: Zwickau
residence: Zeitz
residence: Altenburg