WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Boyvin, Jacques
identifier: 13476692X
birth: 1649-01-01/1655-12-31
death: 1706-06-30, Rouen
sex: m
occupation: Organist
occupation: Komponist
residence: Rouen
ab 1674 (bis zu seinem Tod) Organist der Kathedrale in Rouen