WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Sydenham, Thomas
identifier: 11875808X
birth: 1624-09-10, Winford Eagle, Dorsetshire
death: 1689-12-29, London
sex: m
occupation: Arzt
residence: London